CREATE TABLE IF NOT EXISTS app_settings (
    key   TEXT PRIMARY KEY,
    value TEXT NOT NULL
);

INSERT OR IGNORE INTO app_settings(key, value) VALUES ('library_sync_interval_hours', '6');
